    Add NIS+ Server

    This window allows you to configure NIS+ master servers or NIS+
    replica servers. Note: NIS+ is only supported on Solaris 2.4 or Solaris
    2.5x.

    Server Type

    Use this toggle to specify what type of NIS+ server to configure, a
    Master (the default) or Replica server. If you set this to be a
    Replica server, the window will be redrawn to show the Replica server
    fields.

    Master Fields

        This window has the following fields:

        NIS+ Master Hostname

        Use this field specify the hostname of the NIS+ master server.

        NIS+ Domain Name

        Use this field specify the domain name for the NIS+ master server.

        NIS Compatibility mode

        Use this toggle to specify if this NIS+ should be made backwards
        compatible with NIS. The default is Yes.


        Server root password

        Use this field to specify the root password for the NIS+ master
        server.

        Admin members

        Use this field to specify which users are allowed to administer this
        NIS+ host. Leave a blank space between names for multiple entries.

        Import Data from

        Use this toggle to specify if any existing imported data should come
        from the servers' /etc files or from an NIS server. The default is
        /etc.

        /etc pathname

        You can only use this field if you set the Import Data from field to
        /etc files. If so, you can use this field to specify these files'
        pathname.

        NIS domain

        You can only use this field if you set the Import Data from field to
        NIS. If so, you can use this field to specify the domain name of the
        NIS server from which to import the data.

        NIS Server

        You can only use this field if you set the Import Data from field to
        NIS. If so, you can use this field to specify the hostname of the
        NIS server.

    Replica Fields

        NIS+ Master Hostname

        Use this field specify the hostname of the NIS+ master server.

        NIS+ Domain Name

        Use this field specify the domain name for the NIS+ master server.

        Replica Hostname

        Use this field specify the hostname of the NIS+ replica server.

        Replica Server root Password

        Use this field to specify the root password for the NIS+ replica
        server.

        NIS Compatibility mode

        Use this toggle to specify if this NIS+ server can also interact
        with NIS servers. The default is Yes.

    Buttons (both types of NIS+ servers)

    This window contains the following buttons:

    Apply

    Click on this button to add the new NIS server shown in the window.

    Clear Fields

    Click on this button to clear the existing choices in all fields.

    Close

    Click on this button to discard any changes and close the window.
